Euro-Med Cytomel 25mcg/100tablets

Product Details:

Active Ingredient: Liothyronine Sodium (T3)

Strength: 25 mcg, 50 mcg, or 100 mcg per tablet (depending on the dosage)

Form: Oral tablet

Purpose: Fat loss, energy boost, metabolic enhancement, and thyroid hormone replacement

How It Works:

Cytomel works by increasing the levels of T3 in the body, which regulates metabolism and energy production. T3 stimulates the metabolism of proteins, fats, and carbohydrates, leading to an increase in energy expenditure and fat burning. This acceleration of metabolic rate helps individuals lose weight and enhance overall energy levels.

Who Should Use It?

Individuals with hypothyroidism needing thyroid hormone replacement

Bodybuilders or athletes looking to enhance fat loss during cutting phases

Those seeking an energy boost or an increase in metabolic rate

Not recommended for individuals with thyroid issues without medical supervision

Usage Instructions:

Dosage:

Typical dose for fat loss: 25–75 mcg per day, depending on individual tolerance and cycle goals

Start low and gradually increase dosage to assess tolerance

Administration: Oral, typically taken once daily in the morning to prevent potential insomnia

Cycle Duration: 4–6 weeks, followed by a break to avoid thyroid suppression

Stacking: Often combined with other fat-burning agents or anabolic steroids during cutting cycles

Warnings & Precautions:

Possible Side Effects: Increased heart rate, anxiety, insomnia, sweating, muscle cramps, and potential thyroid suppression with prolonged use

Not suitable for:

Individuals with hyperthyroidism, heart conditions, or adrenal issues

Pregnant or breastfeeding women

Those with a history of cardiovascular diseases

Monitor thyroid function regularly if using Cytomel for extended periods

Post-Cycle Therapy (PCT): Not usually required, but may be needed if thyroid function is suppressed

Storage Instructions:

Store in a cool, dry place, away from direct sunlight

Keep out of reach of children

Do not use if the packaging is damaged or if tablets appear discolored

The post Euro-Med Cytomel 25mcg/100tablets appeared first on Peak Human Shop.