Bodytech Cytomel T3 25mcg (100 Tablets)

Product Details:

Brand: Bodytech

Compound: Liothyronine Sodium (T3)

Strength: 25 mcg per tablet

Quantity: 100 tablets

Form: Oral tablet

Primary Use: Fat loss, metabolic stimulation, cutting support

How It Works:

Cytomel T3 is a synthetic form of the T3 thyroid hormone, which plays a crucial role in regulating metabolism, body temperature, and energy production. By increasing the levels of circulating T3, this compound accelerates the metabolic rate, resulting in faster calorie and fat burning, increased thermogenesis, and greater energy expenditure. It also helps the body use stored fat as fuel, making it effective for reducing body fat during dieting or cutting phases.

Who Should Use It?

Bodybuilders or fitness enthusiasts looking to enhance fat loss during cutting phases

Advanced users seeking a metabolic boost alongside anabolic cycles

Not intended for beginners, casual dieters, or individuals without a proper training/diet plan

Not suitable for those with thyroid disorders without medical supervision

Usage Instructions:

Starting Dose: 25 mcg per day

Titration: Increase by 12.5–25 mcg every 3–5 days if needed

Typical Cycle: 25–75 mcg per day, for 4–6 weeks

Administration: Take orally, once per day, ideally in the morning on an empty stomach

Taper Off: Always taper down the dosage at the end of the cycle to avoid thyroid suppression

Warnings & Precautions:

Possible Side Effects:

Increased heart rate, anxiety, insomnia, sweating, muscle loss (if overused)

Heart palpitations, headaches, irritability

Risk of long-term thyroid suppression if misused

Do not use if:

You have heart disease, hyperthyroidism, or uncontrolled hypertension

You are pregnant or breastfeeding

Interactions: May interact with stimulants (e.g., Clenbuterol, caffeine), insulin, or diabetes medications

Medical supervision is advised, especially for extended use or high doses

Storage Instructions:

Store in a cool, dry place, ideally below 25°C (77°F)

Keep away from heat, moisture, and direct sunlight

Store in original packaging or a secure, airtight container

Keep out of reach of children and pets

Do not use past the expiration date

The post Bodytech Cytomel T3 25mcg (100 Tablets) appeared first on Peak Human Shop.