Meditech Cytomel T3 25mcg (100 Tablets)

Product Details:

Brand: Meditech

Active Ingredient: Liothyronine Sodium (T3)

Strength: 25 mcg per tablet

Quantity: 100 tablets

Form: Oral tablet

Use: Metabolic stimulation, fat loss, cutting cycles

How It Works:

Cytomel T3 mimics the natural triiodothyronine (T3) hormone produced by the thyroid gland. It increases the metabolic rate, accelerates calorie burning, and enhances the use of fat for energy. This makes it a powerful fat-loss aid, especially when used with a calorie-controlled diet and exercise. T3 acts faster and is more potent than T4 (thyroxine), making it a preferred choice for rapid results.

Who Should Use It?

Bodybuilders and athletes during cutting cycles aiming to shed body fat while maintaining muscle

Individuals with diagnosed hypothyroidism, under medical supervision

Advanced users of performance-enhancing drugs familiar with hormone manipulation

Not suitable for:

Beginners

Those with thyroid or cardiovascular conditions

Pregnant or breastfeeding women

Usage Instructions:

Typical Fat Loss Protocol:

Start at 25 mcg/day

Increase gradually by 12.5–25 mcg every 3–5 days, maxing out around 75–100 mcg/day, depending on experience and tolerance

Cycle Duration: 4–6 weeks recommended, followed by a break to allow thyroid recovery

Administration: Oral, once daily in the morning (preferably on an empty stomach)

Tapering off is essential to avoid thyroid shock—reduce dose gradually rather than stopping abruptly

Warnings & Precautions:

Possible Side Effects:

Insomnia, sweating, tremors, anxiety, increased heart rate

Muscle loss if not combined with adequate protein intake and/or anabolic support

Long-term use may suppress natural thyroid function

Do not use if you have:

Heart disease, high blood pressure, or thyroid disorders (unless prescribed)

Uncontrolled diabetes or adrenal issues

Combining with other stimulants (e.g., Clenbuterol) increases risk of side effects

Blood work and professional supervision highly recommended for safe use

Storage Instructions:

Store in a cool, dry place, ideally between 15–25°C (59–77°F)

Protect from light, heat, and moisture

Keep out of reach of children and pets

Do not use past the expiration date or if tablets are discolored or damaged

The post Meditech Cytomel T3 25mcg (100 Tablets) appeared first on Peak Human Shop.